1 Large Preserved Rose in Transparent Bag

New design, larger preserved Rose in Signature acrylic Box. Preserved roses last 1-3 years. Please make note of color of preference.
Box size: 10CM X 10CM X 10 CM

The post 1 Large Preserved Rose in Transparent Bag appeared first on My Divine Decors.